Specification Status
Last Change	January 26, 2006
Status	PRELIMINARY status is the initial conception of a specification. STANDARD A specification with status Standard is considered to be stable and has the approval of the i-Team. OBSOLETE An Obsolete specification is a specification that has been identified unnecessary. For example due to; technology changes or changes in other standards or specifications.

<State Specification Title here>

Sun Confidential: Internal Only	Page 8

Page 8

Christian Jansen

2005-10-19T15:24:24