Deselecting the first formula of the line does not cause any undesired behaviour, but the cursor is not placed correctly after deselecting the two following formulas. In all cases, keyboard input works as intended.
Table with No Style:
First Cell	Deselecting the formula equal to 6 takes me back to the end of the first cell of the table, deselecting the one equal to 7 puts the cursor just before the formula. Keyboard input works as intented. E ( X ) = 6 and the second formula
Table with Default Style: bug described in the report.
E ( X ) = 8	E ( X ) = 9