Dag Wieërs
This document is meant for testing the AsciiDoc ODF backend and highlighting known problems to developers. The output of this document, using the default ODF stylesheet should match the HTML output as close as possible.

Percentage scaling in width
The below example shows an image scaled in percentage for width is not being shown in LibreOffice.

Percentage scaling in height
The below example shows an image scaled in percentage for height does not retain its proportion in LibreOffice

Percentage scaling in both dimensions
The below example shows that the percentages in width and height result in an image that is correctly enlarged to 50% of the width and height of the page.

Scaling in width
The below example shows an image scaled absolutely in width is not being shown in LibreOffice.

Scaling in height
The below example shows an image scaled asolutely in height is not being shown in LibreOffice.

Scaling in both dimensions
The below example shows an image scaled asolutely in width and height is correctly displayed in LibreOffice.
3 of 3